; marscore.def : Declares the module parameters.

LIBRARY      "marscore.dll"

EXPORTS
; Need these two for the runtime proxy registration code  
    DllCanUnloadNow                 PRIVATE
    DllGetClassObject               PRIVATE
;;  DllRegisterServer               PRIVATE
;;  DllUnregisterServer             PRIVATE

    MarsThreadProc                  @5 NONAME

