;
;         File: wshclus.def
;       System: MS-Windows 3.x
;      Summary: Module definition file for the Cluster Transport
;               helper DLL for WinSockAPI DLL.
;

LIBRARY         WSHCLUS        ; Application's module name

HEAPSIZE        1024
STACKSIZE       16384

; All functions that will be called by any Windows routine
; must be exported

EXPORTS
        WSHGetSockaddrType
        WSHGetWildcardSockaddr
        WSHGetSocketInformation
        WSHGetWinsockMapping
        WSHNotify
        WSHOpenSocket
        WSHSetSocketInformation
        WSHEnumProtocols
        WSHOpenSocket2
        WSHGetWSAProtocolInfo
        WSHAddressToString
        WSHStringToAddress
        WSHGetProviderGuid
        WSHIoctl
