;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;
;
;	INTEL CORPORATION PROPRIETARY INFORMATION
;	Copyright (c) 1992 Intel Corporation
;	All Rights Reserved
;
;	This software is supplied under the terms of a license
;	agreement or non-disclosure agreement with Intel Corporation
;	and may not be copied or disclosed except in accordance
;	with the terms of that agreement
;
;    $Source: q:/prism/network/isrdbg/rcs/isrdbg.def $
;  $Revision:   1.0  $
;      $Date:   Feb 05 1996 16:27:28  $
;    $Author:   DMGORLIC  $
;    $Locker:  $
;
;	Description
;	-----------
;	Module definition file for ccstest.exe
;
;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;

; The dll name cannot be the same as a exe file name.
; NAME is for exe.  LIBRARY is for DLL
;NAME			VCI
LIBRARY			IsrDbg32

HEAPSIZE     2048
;STACKSIZE    16384

EXPORTS
;	DllEntryPoint			@1	;Could use any name
;	ISR_OutputDbgStr		@2
;	ISR_OutputStr			@3
;	ISR_OutputNum			@4
;	DbgMsg					@5

	
	; Must be exported or cannot find dynamically - especially 16 bit thunks.
	;OutputRec
	;OutputRecStr
	;ISR_RegisterModule


