; mfcext.def : Declares the module parameters for the DLL.

LIBRARY      "mfcext"
EXPORTS
    ; Explicit exports can go here
	DllCanUnloadNow		PRIVATE
	DllGetClassObject	PRIVATE
	DllRegisterServer	PRIVATE
