Copyright: Monday, March 12, 2001 10:56:15


Close and save changes.


Close without saving changes.


Closes the dialog box.


Click to move a selected column down in the order of displayed columns. The the column will move to the right in the Fax Console display pane.


Click to add a new column in the Fax Console display pane.


Click to remove a selected column from the Fax Console display pane.


Click to move a selected column up in the order of displayed columns. The column will move to the left in the Fax Console display pane.


Lists the columns that can be displayed in the details pane of Fax Console.

Information is displayed for the outgoing faxes in the Outbox folder, incoming faxes in the Incoming folder,  successfully sent faxes in the Sent Items folder, and successfully received faxes in the Inbox folder.


Lists the columns that are displayed in the details pane of the selected node.

Information is displayed for the outgoing faxes in the Outbox folder, incoming faxes in the Incoming folder,  successfully sent faxes in the Sent Items folder, and successfully received faxes in the Inbox folder.


Displays the name of the fax sender.


Displays the name of the fax sender. This is part of the sender information included on the cover page.


Provides a space to type the name of the fax sender. Sender information specified is included when you send a cover page.  Default sender information is the same for all cover pages, but you can also specify different sender details to be attached to a specific fax.


Displays the sender's fax number.


Displays the sender’s fax number. This is part of the sender information included on the cover page.


Provides a space to type the sender’s fax number. In a network configuration, where you use a remote fax device, this might not be the number that the fax is actually sent from.


Provides a space to type in the sender’s address.


Displays the fax sender’s address.


Provides a space to type the sender’s billing code. A billing code can be allocated to track outgoing faxes, in order to assign the costs of faxing documents to a specific account.


Displays the billing code assigned for the fax sender. . A billing code can be allocated to track outgoing faxes, in order to assign the costs of faxing documents to a specific account.


Provides a space to type the sender’s work telephone number


Displays the fax sender’s business phone number.


Provides a space to type the sender’s company details


Displays the fax sender’s company details.


Provides a space to type the fax sender’s department details


Displays the fax sender’s department details.


Provides a space to type the sender’s e-mail address.


Displays the fax sender’s e-mail address.


Provides a space to type the sender’s home telephone number.


Displays the fax sender’s home phone number.


Provides a space to type location information for the sender.


Displays the fax sender’s office details.


Provides a space to type the sender’s title


Displays the fax sender’s title.


Displays identification information provided by the fax sender.


Displays the Called Subscriber ID information.  The CSID is used to identify a fax recipient to a fax sender. The CSID is transmitted to a fax sender when an incoming fax call is detected. It usually consists of the recipient’s fax number, and business name.


Displays the name of the fax device that was used to send the fax.  This can be a local fax device attached to your computer or a remote fax device, located on a network.


Displays the job identification number. This is an internal number provided by Fax to uniquely identify a specific fax job.


Displays additional routing information, if sent by the fax sender


Displays the Transmission Station ID information,. The TSID is used to identify a fax sender to a fax recipient. The TSID is transmitted to a fax recipient when a fax is sent, and might appear in the display of a recipient’s fax machine.  It usually consists of the sender’s fax number, and business name.


Displays the name of the fax transmission. If you have sent a fax from an application, it includes the document name used in the application.


Displays the name of the recipient of the fax transmission.


Displays the recipient's fax number.


Displays the subject of the fax. The subject is specified as part of the cover note details, if required by the cover page template.


Displays the size of the fax in bytes.


Displays the amount of time that elapsed between the start and end of a fax transmission.


Displays the time that fax transmission ended. This does not indicate that the fax was sent successfully.


Displays the local time when fax transmission began.


Displays the final status of the successfully received fax. The Inbox is the archive of all successfully received faxes.


Displays the number of pages that were received.


Displays the time that Fax began its last transmission attempt.


Specifies whether the sender information is used for this cover page fax only, and does not replace the default sender information.


Displays the number of pages that were sent.


Displays the status of the outgoing fax at the time this dialog was opened. The most recent status is displayed in the details pane of Fax Console.


Displays the total number of pages in the outgoing fax.


Displays the number of the page being transmitted when this dialog was opened. The most recent information is displayed in the details pane of Fax Console.


Displays the extended status of the outgoing fax at the time this dialog was opened. The most recent extended status is displayed in the details pane of Fax Console.


Displays the priority of the fax transmission. As a computer administrator, you can set a priority for each fax sent from a local fax device. If you use a remote fax device, your ability to assign a priority to an outgoing fax will depend on security permissions assigned to you by the fax administrator. Priority is specified in the Send Fax Wizard can be High, Normal or Low. Normal is the default priority. HIDC_PRIORITY_TITLE


Displays the time at which the fax job is currently scheduled. This may be later than the original scheduled time, specified by the fax sender, due to delays such as a busy number, or a fax device that is busy with other faxes.


Displays the time when the sender submitted the fax for sending.


Displays the identification number provided by Fax to identify a specific fax transmission to multiple fax recipients.


Displays the name of the computer user account sending the fax.


Displays the page that is currently being received at the time this dialog was opened. The most recent information is displayed in the details pane of the console.


Displays the extended status of the incoming fax at the time this dialog was opened. The most recent information is displayed in the details pane of Fax Console.


Displays the status of the incoming fax at the time this dialog was opened. The most recent information about fax status is displayed in the details pane of Fax Console.


Displays the total number of pages in the incoming fax.


Displays the number of times the system has tried to send your fax. The total number of possible retries depends on the limit set. As a computer administrator, you can set this limit for your local fax device, in the Printers and Faxes applet. If you use a remote fax device the fax administrator specifies the maximum number of retries.


Displays the number of times the system has tried to send your fax. The total number of possible retries depends on the limit set. As a computer administrator, you can set this limit for your local fax device, in the Printers and


Displays a list of cover pages in your personal cover page folder. These include cover pages that you have created using the Cover Page Editor or cover page templates that you have copied into your personal folder. Your personal cover pages folder remains empty until you create a cover page, or copy an existing cover page template into the folder.


Click to open the selected cover page template in the Fax Cover Page Editor.


Click to create a new cover page.


Click to rename the selected cover page.


Click to delete the selected cover page. You will be prompted to verify the delete.


Click to copy a cover page from another location. Often, you will copy one of the common cover page templates provided by Fax, but you can copy a cover page from any location.


Displays a list of fax printers, and the status of each fax printer. If you have a local fax device attached to your computer, your local fax printer will be displayed here, as well as any remote fax printer connections. It might be useful to check the status of your fax printers before sending a fax.


Displays a list of fax printers that  you can use to send a fax from Outlook 2000. These include a local fax printer, if you have a local fax device attached to your computer, and remote fax printer connections, where available. You can  check the properties of each fax printer in the Printers and Faxes applet. You can also check the availability status of each fax printer from Fax Console, on the Tools menu.


Specifies that all faxes sent from Outlook 2000 should include a cover page.


Displays a list of available cover pages that you can choose to use when sending faxes from Outlook 2000. The selected cover page will be attached to all faxes sent from Outlook.


Specifies that you want a single receipt to confirm delivery of a fax sent from Outlook 2000 to multiple recipients. This feature is not available if you use a local fax device to send faxes from Outlook 2000.


Displays the name of the default font used when sending faxes from Outlook 2000.


Displays the name of the default font style used when sending faxes from Outlook 2000.


Displays the name of the default font size used when sending faxes from Outlook 2000.


Click to select the font that is used when sending faxes from Outlook 2000.


Specifies whether you want a copy of the fax to be attached with the delivery receipt notification. If you specify that a copy of multi-recipient should be attached to a delivery receipt, and the fax includes a cover page, then the cover page will not be included with the copy of the sent fax. This is because the cover page information will be different for each recipient. In addition, if a multi-recipient fax consists only of a cover page then you cannot attach a copy of the fax to a delivery receipt.


Specifies whether the selected cover page will appear in this fax message sent from Outlook. This does not affect your default settings.


Specifies whether you want a copy of the fax to be attached with the delivery receipt notification for this fax. If you specify that a copy of multi-recipient should be attached to a delivery receipt, and the fax includes a cover page, then the cover page will not be included with the copy of the sent fax. This is because the cover page information will be different for each recipient. In addition, if a multi-recipient fax consists only of a cover page then you cannot attach a copy of the fax to a delivery receipt.


Displays a list of available cover pages, including those in your Personal Cover Pages folder and common cover pages provided by Fax. The selected cover page will appear in this fax.


Click to select a fax printer


Displays a list of standard fax paper sizes.


Displays a list of standard image qualities.


Specifies the orientation that the fax printer should use when sending faxes.


Specifies that faxes sent from this fax printer should have a portrait orientation.


Specifies that faxes sent from this fax printer should have a landscape orientation.


Lists all the local fax devices attached to your computer. Only one of these local fax devices can be configured for sending and receiving faxes.


Displays the TSID for the local fax device selected. The TSID is used to identify a fax sender to a fax recipient. The TSID is transmitted to a fax recipient when a fax is sent, and might appear in the display of a recipient’s fax machine.  It usually consists of the sender’s fax number, and business name.


Displays the CSID for the local fax device selected. The CSID is transmitted to a fax sender when an incoming fax call is detected. It usually consists of the recipient’s fax number, and business name.


Displays the amount of times the line will ring before an incoming fax call is answered automatically.


Click to display the configuration properties of the selected local fax device.


Specifies that the local fax device should be enabled to receive faxes.


Provides space for you to type a CSID. The CSID is transmitted to a fax sender when an incoming fax call is detected. It usually consists of the recipient’s fax number, and business name.


Specifies that an incoming fax call should be answered manually.


Specifies that your computer should answer an incoming fax call automatically.


Specifies the amount of times the line will ring before an incoming fax is automatically answered.


Specifies that an incoming fax should be printed.


Specifies that an incoming fax should be saved to a folder.


Provides space for you to type in the location of the printer to which the incoming fax should be printed.


Provides space for you to type in the location of the folder to which a copy of the incoming fax should be saved.


Specifies that the local fax device should be enabled to send faxes.


Provides space for you to type a TSID. The TSID is used to identify a fax sender to a fax recipient. The TSID is transmitted to a fax recipient when a fax is sent, and might appear in the display of a recipient’s fax machine.  It usually consists of the sender’s fax number, and business name.


Specifies the maximum number of attempts that should be made to send an outgoing fax from your local fax device.


Specifies the time that should elapse between each attempt to send an outgoing fax from your local fax device.


Specifies from what time discount rates should be taken into account when sending faxes.


Specifies at what time discount rates should no longer be taken into account.


Specifies that your outgoing faxes should include a banner. A banner is information that appears on the edge of each page of a transmitted fax. It usually includes the date and time of transmission, the Transmitting Subscriber Identification (TSID), the current page being sent, and the recipient fax number


Specifies that all received faxes should be archived. Incoming faxes are archived in the Inbox folder.


Specifies that all sent faxes should be archived. Sent faxes are archived in the Sent Items folder.


Provides a space for you to type in the location of the Incoming folder, the archive for faxes that have been received successfully.


Provides a space for you to type in the location of the Outbox folder, the archive for faxes that have been sent successfully.


Specifies that a sound should be played when the fax event occurs.


Click to search for a folder for storing fax archived.


Displays a list of local fax devices to be monitored.


Specifies that notification should monitor progress of incoming and outgoing faxes.


Specifies that notification should inform you when an incoming faxes is received successfully, or if an error occurs when receiving an incoming fax.


Specifies that notification should inform you when an outgoing faxes is sent successfully, or if an error occurs when an outgoing fax is sent.


Specifies that Fax Monitor should open automatically when a fax is being sent. If you choose not to enable this option, you can open Fax Monitor manually from the Tools menu of Fax Console.


Specifies that Fax Monitor should open automatically when a fax is being received. . If you choose not to enable this option, you can open Fax Monitor manually from the Tools menu of Fax Console.


Click to enable sounds when fax events occur.


Displays the status of the incoming or outgoing fax.


Displays how much time has elapsed either since the incoming fax was detected, or since sending the outgoing fax began.


Specifies that Fax Monitor should be displayed on top of other windows you have open.


Click to specify that Fax Monitor should be hidden.


Click to disconnect the outgoing or incoming fax call. A further dialog will open for you to confirm disconnection.


Click to display less Fax Monitor information.


Displays more information about an outgoing or incoming fax call.


Click to clear the list.


Select a fax printer for sending your fax.


HIDC_ZIP_CODE_VALUE


HIDC_ZIP_CODE_TITLE


HIDC_STREET_VALUE


HIDC_STREET_TITLE


HIDC_STATE_VALUE


HIDC_STATE_TITLE


HIDC_COUNTRY_VALUE


HIDC_COUNTRY_TITLE


HIDC_CITY_VALUE


HIDC_CITY_TITLE


HIDC_BUT_CP_BROWSE


SpecifieHIDC_CONFIRM_ITEM_DELETION


HIDC_CONFIRM_PRINTER_REMOVAL


HIDC_COVER_PAGES_DIR


HIDC_BUT_ADDRESS. UNUSED


HIDC_STATIC_AVAILABLE


HIDC_STATIC_DISPLAYED


HIDC_SENDER_NAME_VALUE


HIDC_NAME_VALUE


HIDC_SENDER_NUMBER_VALUE


HIDC_FAX_NUMBER_VALUE


HIDC_ADDRESS_VALUE


HIDC_BILLING_CODE_VALUE


HIDC_BUSINESS_PHONE_VALUE


HIDC_COMPANY_VALUE


HIDC_DEPARTMENT_VALUE


HIDC_OFFICE_VALUE


HIDC_TITLE_VALUE


HIDC_EMAIL_VALUE


HIDC_HOME_PHONE_VALUE


HIDC_DURATION_VALUE


HIDC_END_TIME_VALUE


HIDC_START_TIME_VALUE


HIDC_CSID_VALUE


HIDC_DEVICE_VALUE


HIDC_ROUTING_INFO_VALUE


HIDC_TSID_VALUE


HIDC_DOC_NAME_VALUE


PrHIDC_RECIPIENT_NAME_VALUE


HIDC_RECIPIENT_NUMBER_VALUE


HIDC_SUBJECT_VALUE


HIDC_TRANSMISSION_TIME_VALUE


HIDC_PRIORITY_VALUE


HIDC_SCHEDULED_TIME_VALUE


HIDC_SUBMISSION_TIME_VALUE


HIDC_USER_VALUE


HIDC_CALLER_ID_VALUE


Displays the job identification number. This is an internal number provided by Fax to uniquely identify a specific fax job. HIDC_JOB_ID_VALUE