;  File: D:\WACKER\xfer\xferdll.def (Created: 08-Dec-1993)
;
;  Copyright 1994 by Hilgraeve Inc. -- Monroe, MI
;  All rights reserved
;
;  $Revision: 1.8 $
;  $Date: 1997/09/09 15:25:06 $
;

LIBRARY   XFERDLL

;CODE      PRELOAD MOVEABLE DISCARDABLE
;DATA      MULTIPLE

EXPORTS
	; xferdll.c
	XferEntry@12

	; x_entry.c -- the entry points
	xfrGetProtocols@8
	xfrGetParameters@16
	xfrReceive@8
	xfrSend@8

	; various dialog procedures
	XandYmodemParamsDlg@16
	ZmodemParamsDlg@16
	HyperProtocolParamsDlg@16
	KermitParamsDlg@16

