; Copyright (c) 1999 Microsoft Corporation
;
; %%1.DEF
;
; Generated by Microsoft WMI Code Generation Engine
;
; TO DO: nothing
;
;==================================================

LIBRARY         %%1.DLL
DESCRIPTION     '%%2'
EXPORTS
    DllGetClassObject   = DllGetClassObject   PRIVATE
    DllCanUnloadNow     = DllCanUnloadNow     PRIVATE
    DllRegisterServer   = DllRegisterServer   PRIVATE
    DllUnregisterServer = DllUnregisterServer PRIVATE
~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~

The above sequance of tildes must not be removed.  This file is included
in MOENGINE as a resource, and is not NULL-terminated, requiring a unique
substring to identify the end of file.