; rsnotify.def : Declares the module parameters for the DLL.

LIBRARY      "RsNotify"

EXPORTS
    DllCanUnloadNow      PRIVATE
    DllGetClassObject    PRIVATE
    DllRegisterServer    PRIVATE
    DllUnregisterServer  PRIVATE
