LIBRARY NTVDMD

EXPORTS
    xxxDbgInit
    xxxDbgDispatch
    xxxDbgIsDebuggee
    xxxDbgSegmentNotice
    xxxDbgDosAppStart
    xxxDbgTraceEvent
    xxxDbgFault
    xxxDbgBPInt
    xxxDbgTraceInt
    xxxDbgNotifyRemoteThreadAddress
    xxxDbgNotifyDebugged
    xxxDbgNotifyNewTask
