LIBRARY w64cpuex.dll

EXPORTS
    CpuDbgInitEngapi
    CpuDbgGetRemoteContext
    CpuDbgSetRemoteContext
    CpuDbgGetLocalContext
    CpuDbgSetLocalContext
    CpuDbgFlushInstructionCacheWithHandle
    CpuDbgFlushInstructionCache
    CpuDbgGetRegisterFuncs
