;offline.def : Declares the module parameters for the DLL.
;mobsyncp.def is meant for the private library

LIBRARY      mobsync

EXPORTS
     DllCanUnloadNow             PRIVATE         ;DLL unloading
     DllGetClassObject           PRIVATE         ;Component object model
     DllRegisterServer           PRIVATE
     DllUnregisterServer         PRIVATE
     RunDllRegister              @6                     ; Can call RunDLL to register the dll
     SyncMgrRasProc                                     ; Called by Ras for Disconnect
     DisplayOptions
     MobsyncGetClassObject
     RegGetProgressDetailsState
     RegSetProgressDetailsState
     RegGetSyncSettings
     RegRemoveManualSyncSettings
     RegGetHandlerRegistrationInfo
     RegGetSyncItemSettings
     RegSetSyncItemSettings
     RegGetSchedConnectionName
     RegGetSchedSyncSettings
     RegQueryLoadHandlerOnEvent
     RegSetUserDefaults
     RegSchedHandlerItemsChecked
     RegGetHandlerTopLevelKey

     SyncMgrResolveConflictW
     SyncMgrResolveConflictA