LIBRARY KERNEL32

EXPORTS
    VxDCall0            @1    NONAME ;Internal
    VxDCall1            @2    NONAME ;Internal
    VxDCall2@12         @3    NONAME ;Internal
    VxDCall3@16         @4    NONAME ;Internal
    VxDCall4@20         @5    NONAME ;Internal
    VxDCall5@24         @6    NONAME ;Internal
    VxDCall6            @7    NONAME ;Internal
    VxDCall7            @8    NONAME ;Internal
    VxDCall8            @9    NONAME ;Internal

