; RPCREF.def : Declares the module parameters for the DLL.

LIBRARY      "RPCREF"

EXPORTS
    ; Explicit exports can go here
    ; LibMain
        InetinfoStartRpcServerListen
        InetinfoStopRpcServerListen
