LIBRARY     CNETCFG
HEAPSIZE    512

SECTIONS
    .data READ WRITE
    .instance READ WRITE

EXPORTS
    InetConfigSystem
    InetStartServices
    InetNeedModem
    InetNeedSystemComponents


