;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;
;
;   Source File:    STICI.DEF
;
;   Linker Definition file for the Still Image Class installer
;
;
;   Copyright (c) 1997 by Microsoft Corporation.  All Rights Reserved.
;
;   Change History:
;   01-14-97    Bob Kjelgaard Added a header to the DEF file...
;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;

LIBRARY   STI_CI

HEAPSIZE  1024
EXPORTS
          DllInitialize
          ClassInstall


