LIBRARY ICAAPI

EXPORTS
    IcaOpen
    IcaClose
    IcaIoControl
    IcaSystemTrace
    IcaTrace
    IcaStackOpen
    IcaStackClose
    IcaStackTerminate
    IcaStackConnectionWait
    IcaStackConnectionRequest
    IcaStackConnectionAccept
    IcaStackConnectionClose
    IcaStackQueryState
    IcaStackCreateShadowEndpoint
    IcaStackCallback
    IcaStackDisconnect
    IcaStackReconnect
    IcaStackIoControl
    _IcaStackIoControl
    IcaStackTrace
    IcaStackUnlock
    IcaChannelOpen
    IcaChannelClose
    IcaChannelIoControl
    IcaChannelTrace
    IcaMemoryAllocate
    IcaMemoryFree
    IcaCdIoControl
    IcaCdWaitForSingleObject
    IcaCdWaitForMultipleObjects
    IcaCdCreateThread
    IcaPushConsoleStack
